Shaper Origin + BenchPilot + Workstation + Plate

Workstation

Workstation is our ultimate workspace and fixturing solution for your benchtop cutting operations. It’s designed to streamline and expand upon Origin’s abilities, offering rapid, repeatable and precise fixturing of a wide range of stock configurations.

Workstation features a reusable tape field, easily adjustable shelf for small or difficult-to-fixture workpieces, and intuitive indexing pins for alignment and registration. This greatly reduces setup time and makes it easier than ever to get cutting straight out of the box.

BenchPilot

Enables automated, hands-free cutting for Origin so you can focus on other tasks at hand. Clip Origin into BenchPilot and let it drive Origin from point A to point B, while Origin continues to handle the small precision movements. Think of it like autopilot for Origin.

Drives Origin Automatically

Variable feed rate control knob

Clip and unclip Origin easily

Display shows cut time remaining

Cut vertically or horizontally

Plate

Shaper Plate is the universal template for Origin

Shaper Plate brings efficiency and precision to your projects when installing hardware, inlaying in slabs, corner rounding, routing system 32 holes in cabinetry, and much, much more.

Origin

Shaper Branded Systainer³ M437 Carrying Case

Two rolls of ShaperTape (150-ft each)

Tool change accessories

Reusable transport locks

USB A/C dual flash drive

1/4-inch up-spiral flat router bit

1/8-inch up-spiral flat router bit

60 degree engraving router bit

The post Shaper Origin + BenchPilot + Workstation + Plate appeared first on Edward B. Mueller Co., Inc..